[picture] | Computer Systems Science & Engineering | [picture]

DOI: 10.32604/csse.2024.054265

RETRACTION

Retraction: Deep Belief Network for Lung Nodule Segmentation and Cancer Detection

Computer Systems Science and Engineering Editorial Office

Published Online: 17 July 2024

The published article titled “Deep Belief Network for Lung Nodule Segmentation and Cancer Detection” has been retracted from Computer Systems Science and Engineering, Vol. 47, No. 1, 2023, pp. 135–151.

DOI: 10.32604/csse.2023.030344

URL: https://www.techscience.com/csse/v47n1/52978

The Editors-in-Chief have retracted this article because, upon further review, in their judgment the article proffers insufficient critical assessment of the material presented and literature cited, which, in their view, invalidates the conclusions drawn.

All authors have not responded to correspondence about this retraction. As a responsible publisher, we hold the reliability and integrity of our published content in high regard. We deeply regret any inconvenience caused by this situation to our readers and all concerned parties.

[picture] | This work is licensed under a Creative Commons Attribution 4.0 International License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Table of Contents

Retraction: Deep Belief Network for Lung Nodule Segmentation and Cancer Detection

Guide

Retraction: Deep Belief Network for Lung Nodule Segmentation and Cancer Detection